plngdhx

Entries 635073 Mean 3.661 RMS 1.244 Underflow 0 Overflow 3

0 1 2 3 4 5 6 7 8 9 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10 plngdhx

Thu Sep 5 13:49:58 2002

number of good hits

Thu Sep 5 13:51:53 2002