misexp

Entries 635073 Mean 1.18 RMS 0.7872 Underflow 0 Overflow 0

-1 0 1 2 3 4 5 6 7 0

500

1000

1500

2000

2500

3000 2 x10 misexp

Thu Sep 5 13:52:36 2002

missed expected

Thu Sep 5 13:53:50 2002