SumEt

Entries 1000 Mean 32.67 RMS 20.26 Underflow 0 Overflow 58 Integral 942

Et (GeV)

0 10 20 30 40 50 60 70 80 90 100 0

10

20

30

40

50

60

Max Tower Energy for L1 - Monte Carlo