SumEt

Entries 1000 Mean 134.4 RMS 71.91 Underflow 0 Overflow 11 Integral 989

Sum Et (GeV)

0 50 100 150 200 250 300 350 400 0 10 20 30 40 50 60 70 80 Sum Et - Monte Carlo