SumEt_L3

Entries 100 Mean 121.3 RMS 35.87 Underflow 0 Overflow 1 Integral 99

0 50 100 150 200 250 0 1 2 3 4 5 6 7 8 Sum Et of 4b state GENP particles (L123 bg)