0 1 2 3 4 5 6 7 8 9 10 0

0.1

0.2

0.3

0.4

0.5

0.6 MC DATA

Axial hits

0 1 2 3 4 5 6 7 8 9 10 0

0.1

0.2

0.3

0.4

0.5 MC DATA

Good axial hits

0 1 2 3 4 5 6 7 8 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 MC DATA

Axial hits usage

0 1 2 3 4 5 6 7 8 9 10 0 0.1 0.2 0.3 0.4 0.5 0.6 MC DATA

Max phi clus length