Noise

SVX- barrel 2 W3 phi side

149388/1 149261/1 L0

0 50 100 150 200 250 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 Hsn1_r0_2W3_p0

L1

0 50 100 150 200 250 300 350 0.5 1 1.5 2 2.5 3 3.5 4 4.5 Hsn1_r0_2W3_p1

L2

0 100 200 300 400 500 600 1 1.5 2 2.5 3 3.5 4 4.5 Hsn1_r0_2W3_p2

L3

0 100 200 300 400 500 600 700 0.5 1 1.5 2 2.5 3 3.5 4 4.5 Hsn1_r0_2W3_p3

L4

0 100 200 300 400 500 600 700 800 1 1.5 2 2.5 3 3.5 4 4.5 5 Hsn1_r0_2W3_p4