Are Local Coord and Strip Correct

2000/12/13 18.20

L1 ϕ Loc vs Strip

N_{strip} 256 Extent 1.536 cm

L1 z Loc vs Strip

N_{strip} 256*4 Extent 14.6612 cm

L2 ϕ Loc vs Strip

N_{strip} 384 Extent 2.3808 cm

L2 z Loc vs Strip

N_{strip} 384*3 Extent 14.6807 cm

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

0 100 200 300 -8 -6 -4 -2 0 2 4 6 8

0 100 200 300

-1.5 -1 -0.5 0 0.5 1 1.5

0 100 200 300 400 -8 -6 -4 -2 0 2 4 6 8

0 100 200 300 400