D0_data

Entries 3998 Mean 7.396e-06 RMS 0.004663 Underflow 860 Overflow 816 Integral 2322 / ndf

2χ 146.5 / 88 Prob 9.05e-05 Constant 2.577±

92.34 Mean 8.088e-05 ± 1.187e-05 Sigma 6.741e-05 ± 0.003761

Corrected d0 (cm)

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0

20

40

60

80

100

120

± ±

D0 data

Subtract 32 micron beam = 19 micron

D0_geo

Entries 3888 Mean -1.553e-06 RMS 0.001245 Underflow 0 Overflow 0 Integral 3888 / ndf

2χ 41.79 / 26 Prob 0.0258 Constant 10.37± 510.4 Mean 1.943e-05 ± 5.435e-06 Sigma 1.487e-05 ± 0.001203

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0

100

200

300

400

500

± ±

D0 geo

D0_phys

Entries 3442 Mean 0.001474 RMS 0.001438 Underflow 0 Overflow 0 Integral 3442 / ndf

2χ 34.21 / 27 Prob 0.1601 Constant 8.416±

392.4 Mean 2.388e-05 ± 0.001488 Sigma 1.79e-05 ± 0.001386

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0 50 100 150 200 250 300 350 400

± ±

D0 phys D0_para

Entries 3395 Mean 0.000252 RMS 0.001515 Underflow 0 Overflow 0 Integral 3395 / ndf

2χ 36.24 / 27 Prob 0.1102 Constant 7.99± 365.5 Mean 2.535e-05 ± 0.0002452 Sigma 1.972e-05 ± 0.001467

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0 50 100 150 200 250 300 350 400 D0_para

± ±

D0 para