0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 500 1000

1500

2000

2500

3000

3500

4000

4500 2 x10 htemp Nent = 612341 Mean = 0.7409 RMS = 0.4381 Under = 0 Over = 0 Integ = 6.123e+05

fSiStripList.fStatus htemp

BAD GOOD