-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 0

-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 1

-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 2

-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 3

-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 4

-30 -20 -10 0 10 20 30 -30

-20

-10

0

10

20

30

RPhi of good strips in Bulkhead 5