htemp Entries 1553 Mean 3.113 RMS 1.826 Underflow 0 Overflow 0

0 1 2 3 4 5 6

-0.001

-0.0005

0

0.0005

0.001

gres:phi0 {abs(gres)<0.005&&barrel==0&&ladseg==1&&layer==1&&side==0}