htemp Entries 1552 Mean 129 RMS 68.23 Underflow 0 Overflow 0

0 50 100 150 200 250 0 5 10 15 20 25

posstp {abs(gcres)<0.005&&barrel==0&&ladseg==1&&layer==1&&side==0}