htemp Entries 56027 Mean 1.032e-05 RMS 0.001806 Underflow 0 Overflow 0

-0.015-0.01-0.005 -0 0.005 0.01 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

gcres-tcres {abs(gcres-tcres)<0.02&&abs(gres-tres)<0.02&&side==0}