htemp Entries 8141 Mean 4.683e-05 RMS 0.001046 Underflow 0 Overflow 0

-0.02-0.015-0.01-0.005 0 0.0050.010.0150.02 1

10

10^2

10^3

gcres {abs(gcres)<0.02&&side==0&&layer==3}