Problem of Charge Loss in 90^∘-Z BW5

ϵ = 0.963 ± 0.004

Problem of Charge Loss in 90^∘-Z BW7

ϵ = 0.852 ± 0.016

No Problem of Charge Loss in Axial BW5

ϵ = 0.971 ± 0.003

No Problem of Charge Loss in Axial BW7

ϵ = 0.973 ± 0.007