Pt of Track (GeV)

0 2 4 6 8 10

Width of D0 Distribution (cm)

0

0.002

0.004

0.006

0.008

0.01

0.012

0

Baseline Fudge Hits on Trks Smear all Strips

D0 Width vs Pt