-0.15 -0.1 -0.05 0 0.05 0.1 0.15 0 5 10 15 20 25 30 35 40 45 htemp Nent = 2712 Mean = 0.0004156 RMS = 0.08639

philoc {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrp==30)&&(abs(philoc)<0.15)}

htemp

-0.06 -0.04 -0.02 0 0.02 0.04 0.06 0

100

200

300

400

500

600 htemp Nent = 2633 Mean = 4.989e-05 RMS = 0.004382 Chi2 / ndf = 168.1 / 39 16.28 ± Constant = 581.7 4.771e-05 ± Mean = 2.072e-05 4.599e-05 ± Sigma = 0.002367

pdist[0] {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrp==30)&&(abs(philoc)<0.15&&abs(pdist[0])<0.062)}

± ± ±