-4 -2 0 2 4 0

10

20

30

40

50 60 htemp Nent = 2715 Mean = -0.5732 RMS = 3.127

zloc {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrz==30)&&((abs(zloc)<5&&abs(zloc)>1))}

htemp

-0.1 -0.05 0 0.05 0.1 0

100

200

300

400

500 htemp Nent = 2614 Mean = 0.008443 RMS = 0.01744 Chi2 / ndf = 335.3 / 69 14.4 ± Constant = 489.3 0.0001096 ± Mean = 0.01063 0.0001064 ± Sigma = 0.005202

zdist[0] {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrz==30)&&(abs(zdist[0])<0.1255&&(abs(zloc)<5&&abs(zloc)>1))}

± ± ±