-4 -2 0 2 4 0

2

4

6

8

10 12 htemp Nent = 465 Mean = 0.2203 RMS = 3.054

zloc {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrz==30)&&((abs(zloc)<5&&abs(zloc)>1))}

htemp

-0.1 -0.05 0 0.05 0.1 0 10 20 30 40 50 60 70 htemp Nent = 396 Mean = 0.006337 RMS = 0.02587 Chi2 / ndf = 85.63 / 46 5.341 ± Constant = 59.39 0.0003432 ± Mean = 0.01125 0.0004215 ± Sigma = 0.006046

zdist[0] {(layer==2&&phiwedge==8&&bulkhead==3&&pt>1&&nstrz==30)&&(abs(zdist[0])<0.1255&&(abs(zloc)<5&&abs(zloc)>1))}

± ± ±