(GeV) TE 0 50 100 150 200 250 300 350 400

Tag Rate

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

Positive Rates Observed Predicted

(+ tags) TE

(GeV) TE 0 50 100 150 200 250 300 350 400

Tag Rate

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

(- tags) TE

Negative Rates Observed Predicted