L00 Bug in 3.18.0int3–3.18.0int6

• There was a bug that declared the central region of each L00 ladder to be inactive.

• As of ver 3.18.0int6 this has been fixed

SiGeometry Status

• As of ver 3.18.0int7, the SiliconGeometry is more or less finalized

• Next minor change will be in definition of wafer volumes to more correctly take into account particles in MC that pass through both an active and inactive region