Strip Units

-15 -10 -5 0 5 10 15 0 2 4 6 8 10 12 14 16 htemp Nent = 309 Mean = -0.1689 RMS = 3.869 Under = 0 Over = 0 Integ = 309

Biased Residual on Axial L6 with New L5 L6 Geometry