Strip Units

-400 -200 0 200 400 600 0 1 2 3 4 5 6 7 8 htemp Nent = 165 Mean = 11.91 RMS = 199 Under = 0 Over = 0 Integ = 165

Biased Residual on Shallow Stereo L6 htemp