microns

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

10

20

30

40

50

Nent = 1053 Mean = -0.1844 RMS = 4.29 Under = 0 Over = 0

Diff b/w circle and straight line at L2

microns

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0

20

40

60

80

100

120

Nent = 1053 Mean = 0.0009522 RMS = 0.1062 Under = 1 Over = 1 Chi2 / ndf = 67.38 / 40 Prob = 0.003262 4.455 ± Constant = 99.11 0.002537 ± Mean = -0.003928 0.002514 ± Sigma = 0.0792

Diff b/w circle and approx at L2

± ± ±