m_H (GeV)

1-CL=5%

1-CL

L3 Preliminary189-196 GeV

Observed CL Expected Median CL

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

90 91 92 93 94 95 96 97 98 99 100