(cm) xyl -0.4 -0.2 0 0.2 0.4

1

10

10^2

Nent = 1406

< -0.05: 210 xyl > 0.05: 450 xyl

25 ± = 240 Δ

° 90 ≤ϕΔ≤° 1mm 2

≤ _0 d≤mμ 150