Λ0b DECAYMODES

Λ0b DECAYMODES Fraction(Γ i /Γ) Confidence level (MeV/c)

J/ψ(1S)Λ (4.7±2.8) × 10^−4 1744 Λ+c π^− seen 2345 Λ+c a1(1260)^− seen 2156 Λ+c ℓ^− νℓ anything [s] (7.7±1.8) % { p π^− < 5.0 × 10^−5 90% 2732 p K^− < 5.0 × 10^−5 90% 2711