)^2

Graviton mass (GeV/c

300 400 500 600 700 800 ll) (pb) → Br(G ⋅σ

10^{-5}

10^{-3}

10^{-1}

10

10^3

10^4

ll) limit(95% C.L.) → Br(G ⋅σ 1.3 × ll) PYTHIA → Br(G ⋅σ Randall-Sundrum Model 2 325 GeV/c^2

600 GeV/c

= 0.1 Pl k / M

= 0.03 Pl k / M

= 0.01 Pl k / M

)^{-1}

CDF Run II Preliminary (126 pb