)^2

Z’ mass (GeV/c

300 400 500 600 700 800 ll) (pb) → Br(Z’ ⋅σ

10^{-3}

10^{-2}

10^{-1}

1

10

10^2

ll) limit (95% C.L.) → Br(Z’ ⋅σ 1.3 × ll) LO → Br(Z’ ⋅σ )_I (Z^2

545 GeV/c )_χ (Z^2

590 GeV/c )_ψ (Z^2

605 GeV/c )_η (Z^2

630 GeV/c

2 730 GeV/c (Z’ SM coupling)

)^{-1}

CDF Run II Preliminary (126 pb

→

1