dE/dx [ns]

5 10 15 20 25

Number of entries

0 500 1000

1500

2000

2500

3000

3500

π K

CDF RunII Preliminary π ^0 D

→^*D π K →^0D

(Pt > 2 GeV/c) σ separation=1.16