Entries 20970

Underflow 71

Overflow 38

2 GeV/c

-25 -20 -15 -10 -5 0 5 10 15 20 25

)^2 GeV/c Events/(.5

0 200 400 600 800 1000

1200

1400^{Entries 20970}_{Underflow 71}

)^{-1}

(~108 pb

Preliminary II Run CDF_2 GeV/c

=180 MC tm

Expected statistical errors