80 100 120 140 160 180 200 220 240 260 280

)^2 GeV/c Events/(15

0 1 2 3 4 5 6 7 8_{Data (22 evts)}

Signal + Bkgd

Bkgd only

)^{-1}

CDF Run II Preliminary (~108 pb

= 177.5 +12.7 / -9.4 (stat.) +- 7.1 (syst) topM

130 140 150 160 170 180 190 200 210 220

Ln(L) Δ-

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

)^2

Top Mass (GeV/c

)^2

Tagged Events (GeV/c

Reconstructed Top Mass,