Photon Et (GeV)

25 30 35 40 45 50 55 60

Photon + b cross-section (pb)

0

10

20

30

40

50

60 CDF Run 2 Preliminary -1 L = 66.7 pb

∫_{LO (Pythia CTEQ5L)}