strzq

Fraction of L1 Z Strips Above Q 127 ADC

Entries Mean RMS 94047 16.50 17.62

strzq

Entries Mean RMS 240 165.7 30.26

Single Strip ADC Counts

1 10 10^2

10^3

10^4

0 25 50 75 100 125 150 175 200 225 250

1

10

120 140 160 180 200 220 240