Unbiased Resid at L1 for Hi,Lo Chg Clusters

Entries Mean RMS 4038 -0.6686E-04 0.5707E-02 225.0 / 62 Constant 361.2 Mean -0.3937E-04 Sigma 0.4212E-02

Unbiased Resid to Nearest Clust, Q.lt.50

Entries Mean RMS 799 0.6320E-04 0.8774E-02 59.15 / 58 Constant 42.70 Mean -0.1298E-03 Sigma 0.6927E-02

Unbiased Resid to Nearest Clust, Q.gt.100^{cm}

0 100 200 300 400 500

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 10 20 30 40 50 60 70

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05