M_{eq}^{5C} (GeV)

Data BG

Events/(2 GeV)

M_{eq}^{5C} (GeV)

LO HI

HZ5bb^−qq^_ 95 GeV

Efficiency/(2 GeV)

0

50

100

150

60 80 100 0

0.1 0.2 0.3 0.4 0.5

60 80 100