m_H (GeV)

Measured CL Average CL from MC Probability to Observe Higher CL

m_H Γ 95.5 GeV at 95% CL

L3 Preliminary

0

0.2

0.4

0.6

0.8

1

78 80 82 84 86 88 90 92 94 96 98