0 50 100 150 200 250 0

10

20

30

40

50

Cal Interval 49

0 50 100 150 200 250 0 20 40 60 80 100 120 140 Cal Interval 50

0 50 100 150 200 250 0

10

20

30

40

50

60

Cal Interval 51

0 50 100 150 200 250 0

10

20

30

40

50

Cal Interval 52

0 50 100 150 200 250 0

10

20

30

40

50

Cal Interval 53