0 50 100 150 200 250 0 20 40 60 80 100 120 140 160 180 200 Nent = 1054 Mean = 46.5 RMS = 2.358

Chan 16, Cal Interval 49

0 50 100 150 200 250 0 20 40 60 80 100 120 140 Nent = 1480 Mean = 100 RMS = 26.2

Chan 16, Cal Interval 50

0 50 100 150 200 250 0 200 400 600 800 1000

1200

1400

1600

Nent = 1713 Mean = 0 RMS = -0

Chan 16, Cal Interval 51

0 50 100 150 200 250 0 50 100 150 200 250 300 Nent = 2051 Mean = 36.33 RMS = 2.787

Chan 16, Cal Interval 52

0 50 100 150 200 250 0 2 4 6 8 10 12 14 16 18 20 22 Nent = 127 Mean = 42.87 RMS = 2.551

Chan 16, Cal Interval 53