0 50 100 150 200 250 0 20 40 60 80 100 120 140 160 pedDist2_0 Nent = 1480 Mean = 116.6 RMS = 25.56 Under = 0 Over = 0 Integ = 1480

pedDist2_0

0 50 100 150 200 250 0 20 40 60 80 100 120 140 pedDist2_16 Nent = 1480 Mean = 100 RMS = 26.2 Under = 0 Over = 0 Integ = 1480

pedDist2_16

0 50 100 150 200 250 0 10 20 30 40 50 60 70 80 90 htemp Nent = 256 Mean = 128 RMS = 73.9 Under = 0 Over = 0 Integ = 4687

pedH:stp_{htemp}