0 50 100 150 200 250 300 0

0.02

0.04

0.06

0.08

0.1

0.12 Entries 49994

Mean 52.57 RMS 23.47

ggA 90 GeV at L1 Before L1 L1 eff 0.056989

SumEt Before L1 Trig Cuts

0 10 20 30 40 50 60 70 80 90 100 0

0.02

0.04

0.06

0.08

0.1

0.12

Entries 49994 Mean 13.96 RMS 7.967

Max EJet Before L1 Trig Cuts