0 50 100 150 200 250 300 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

Entries 34994 Mean 126.8 RMS 60

qqA 90 GeV at L1 Before L1 L1 eff 0.687730

SumEt Before L1 Trig Cuts

0 10 20 30 40 50 60 70 80 90 100 0

0.01

0.02

0.03

0.04

0.05

Entries 34994 Mean 32.9 RMS 20.57

Max EJet Before L1 Trig Cuts