npos_neg

Entries 1764629 Mean 0.0627 RMS 0.2514 Underflow 0 Overflow 0 Integral 0.03504

Number of positive tags in the event

-0.5 0 0.5 1 1.5 2 2.5 3 3.5 fraction

-0.005 -0 0.005

0.01

0.015

0.02

0.025

(- tags)

pos tags

N npos_neg_pred

Entries 1764629 Mean 0.1183 RMS 0.3412 Underflow 0 Overflow 0 Integral 0.04995