-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0

2

4

6

8

10 Nent = 256 Mean = 0.01578

RMS = 0.1977

pedH-pedI

0 0.2 0.4 0.6 0.8 1 1.2 1.4 0

2

4

6

8 10 Nent = 256 Mean = 0.6129 RMS = 0.2871

pedH-pedI

Nent = 256

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0 2 4 6 8 10 12 14 Nent = 384 Mean = -0.05087 RMS = 0.2062

pedH-pedI

Nent = 384

-0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0 2 4 6 8 10 12 14 16 Nent = 384 Mean = 0.2309 RMS = 0.2265

pedH-pedI

Nent = 384

-16 -14 -12 -10 -8 -6 -4 -2 0 2 0 20 40 60 80 100 120 140 160 180 200 220 240 Nent = 640 Mean = -0.2053 RMS = 0.8808

pedH-pedI

-14 -12 -10 -8 -6 -4 -2 0 2 0 20 40 60 80 100 120 140 160 180 200 Nent = 640 Mean = -0.1711 RMS = 0.7643

pedH-pedI