-2 -1.5 -1 -0.5 0 0.5 0

10

20

30

40 50 Nent = 768 Mean = -0.2029 RMS = 0.2271

pedH-pedI

Nent = 768

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0 2 4 6 8 10 12 14 16 18 20 Nent = 512

Mean = -0.003125 RMS = 0.1951 pedH-pedI

-3.5 -3 -2.5 -2 -1.5 -1 -0.5 0 0.5 0 10 20 30 40 50 60 70 80 90 Nent = 896 Mean = -0.1598 RMS = 0.2618

pedH-pedI

Nent = 896

-2 -1.5 -1 -0.5 0 0.5 1 1.5 0 10 20 30 40 50 60 70 80 Nent = 896 Mean = -0.1309 RMS = 0.212

pedH-pedI