Phi of Silicon Tracks

2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 d0 of Silicon Tracks (cm)

-1

-0.5

0

0.5

1 , Run 113480 36X36, Standalone Silicon Tracks d0 vs phi0 {pt>0.2}

Y=0.41cm X=-0.13cm