phi0 (radians)

0 1 2 3 4 5 6 d0 (cm)

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Beam Spot from Silicon Standalone in 36x36

beam

X=-0.13cm

Y=0.41cm