ADC Counts

0 20 40 60 80 100 120 140 160 180 200 0

10

20

30

40

50

Chi2 / ndf = 125.3 / 82 Prob = 0.001098 9.717 ± Constant = 201.3 0.9696 ± Peak = 21.91 0.5798 ± Sigma = 12.41 ± ± ±

Axial Charge L00

ADC Counts

0 20 40 60 80 100 120 140 160 180 200 0 200 400 600 800 1000

1200

1400

1600

1800

Chi2 / ndf = 2110 / 88 Prob = 0 73.73 ± Constant = 8354 0.08873 ± Peak = 22.68 0.04199 ± Sigma = 6.581

Axial Charge SVX Chi2 / ndf = 2110 / 88 ± ± ±

ADC Counts

0 20 40 60 80 100 120 140 160 180 200 0

100

200

300

400

500

600 Chi2 / ndf = 523.4 / 87 Prob = 0 43.79 ± Constant = 2853 0.1493 ± Peak = 25.89 0.0707 ± Sigma = 6.373

Shallow Stereo Charge SVX Chi2 / ndf = 523.4 / 87 ± ± ±

ADC Counts

0 20 40 60 80 100 120 140 160 180 200 0

200

400

600

800

1000

Chi2 / ndf = 475.5 / 85 Prob = 0 60.25 ± Constant = 4497 0.1102 ± Peak = 22.21 0.05457 ± Sigma = 5.493

90 Degree Stereo Charge SVX Chi2 / ndf = 475.5 / 85 ± ± ±