-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0 5 10 15 20 25 30 35

d0h Nent = 734 Mean = 0.001006 RMS = 0.0105 Under = 9 Over = 6 Integ = 719 Chi2 / ndf = 85.99 / 64 Prob = 0.03254 1.759 ± Constant = 31.26 0.0003255 ± Mean = 0.001069 0.0003295 ± Sigma = 0.008101

Impact Par for Si Tracks_{d0h}

± ± ±